[40m[2J[21C[0;1;36mDEFAULT USER PROFILE CONFIGURATION[2;1H[3;1H[5C[s
[u[32mOur Records indicate that this is your first time using Multi-Base Pr[s
[uo.[4;1HOne of the unique features of Multi-Base Pro is it's capability to[s
[u store[5;1Hdefault User Profile Information for any database field input [s
[uthat may be[6;1Hconsidered repetitive and not available from the BBS DOOR[s
[u.SYS (or similar[7;1HDOOR information file).[8;1H[9;1H[5C[37mOnce thi[s
[us information has been defined, entering repetitive data on-line[10;1Hbec[s
[uomes easy for the caller.  Several types of REPEAT options exist allowing
[11;1Hfull featured automatic or optional retrieval of USER PROFILE informat[s
[uion.[12;1H[13;1H[5C[31mThis concept offers ideal power and "SMART" pro[s
[ucessing of your database[14;1Hwith an easy-to-use interface for your call[s
[uer.  Callers may edit or view[15;1Htheir DEFAULT USER PROFILES via the Mu[s
[ulti-Base Access Menu at any time.[16;1H[0m
